                            USING HELP

Many of the topics on the help menu use text windows like this one.  If
there is more than one screen full of text, move the cursor into the window
and use the mouse buttons to scroll through the text.  Clicking the right
button will scroll forward through the text a line at a time.  Use the left
button to move backwards, and rapidly click a button twice to move by pages
instead of lines.  Alternatively, you may use the keyboard.  The keys k/j
move forward/back by lines, f/b move forward/back by pages, and a/z move to
the beginning/end of the file.  When you have finished, click the left
button on the "DONE" box.

The Help Menu selections are:

Using Help - gives this message.

Introduction - describes Getting's three cell model of the Tritonia CPG and
     the way that it has been implemented in this simulation.
     
Running the Simulation - tells how to use the various "buttons" and
     "dialog boxes" at the bottom of the screen and describes the plots
     which are produced. It also tells how to set the injection currents to
     the cells and how to modify the soma and channel parameters.

Things to Try - suggests some exercises and experiments to try.

Program Notes - gives some of the details of the way this model has
     been implemented in the GENESIS scripts.  This will be of interest to
     those who are interested in modifying the simulation or using it as a
     basis for similar simulations.

Quit Help - makes the Help Menu disappear.

